\documentclass[a4paper,11pt]{article}
\usepackage[english]{babel}
\usepackage[utf8]{inputenc}
\usepackage{textcomp}
\usepackage[T1]{fontenc}
\addtolength{\oddsidemargin}{-.5in}
\addtolength{\evensidemargin}{-.5in}
\addtolength{\textwidth}{1in}

%for images
\usepackage[pdftex]{graphicx}

%control line spacing
\usepackage{setspace}
\singlespacing

\usepackage{fancyhdr}
\pagestyle{fancy}
\fancyhead[L]{\texttt{sgen} documentation} 
\fancyhead[R]{INRIA/LIP6 \today}

\usepackage{hyperref}
\hypersetup{pdfborder = {0 0 0}} %remove link borders

\title{\textbf{Documentation for \texttt{sgen}}}
\date{\today}
\author{Chi Pham}

\begin{document}
\maketitle
\tableofcontents
\newpage

\section{About}
We first provide information about the tool, its motivation, and its uses.
\input{about.tex}
\clearpage

\section{Usage}
This section contains information about how the tool is installed and used.
\input{usage.tex}
\clearpage

\section{Implementation}
This section contains information about the implementation details of the tool.
\input{implementation.tex}
\clearpage

\section{Known issues}
This section lists the known issues that might either cause the tool to fail or to generate an erroneous script.
\input{knownissues.tex}
\clearpage

\section{Future work}
This section lists the work to be done on the tool aside from fixing the known issues.
\input{future.tex}

\end{document}
