/* Copyright (C) 2011-2013 Free Software Foundation, Inc.
   Contributed by ARM Ltd.

   This file is part of GCC.

   GCC is free software; you can redistribute it and/or modify it
   under the terms of the GNU General Public License as published
   by the Free Software Foundation; either version 3, or (at your
   option) any later version.

   GCC is distributed in the hope that it will be useful, but WITHOUT
   ANY WARRANTY; without even the implied warranty of MERCHANTABILITY
   or FITNESS FOR A PARTICULAR PURPOSE.  See the GNU General Public
   License for more details.

   You should have received a copy of the GNU General Public License
   along with GCC; see the file COPYING3.  If not see
   <http://www.gnu.org/licenses/>.  */

/* Before using #include to read this file, define a macro:

      AARCH64_ARCH(NAME, CORE, ARCH, FLAGS)

   The NAME is the name of the architecture, represented as a string
   constant.  The CORE is the identifier for a core representative of
   this architecture.  ARCH is the architecture revision.  FLAGS are
   the flags implied by the architecture.  */

AARCH64_ARCH("armv8-a",	      cortexa53,	     8,  AARCH64_FL_FOR_ARCH8)
